H Q Kvc D g Q AlumTank

AlumStoc

AlumStockMax FcmValveOrifice

( , , , ) (=^{kMax}

FcmValveOrifice

Kvc D g m ⋅ ⋅ ⋅ ⋅ + ( . ) ) . 0 5 1 2 1 2 2 π